Require Multiple Approving Reviews for Protected Branches

The Protected Branches API now has a setting for requiring up to 6 approving pull request reviews. You can manage and view this setting from four endpoints:

Get branch protection

Update branch protection

Get pull request review enforcement of protected branch

Update pull request review enforcement of protected branch

How can I try it?

To access this functionality during the preview period, you’ll need to provide the following custom media type in the Accept header:

application/vnd.github.luke-cage-preview+json

Take a look at the docs here. If you have any questions, please get in touch.